Click this button to display advanced settings for ELSA VICTORY II hardware and software drivers.


Click this button to display settings for viewing output on a TV


Click this button to select refresh rates for specific video modes.


Click this button to reset all Gamma values to the last saved values


Click this button to display hardware and driver information


Click this button to reset all Gamma values to factory default values.


Check this box to link the Red, Green and Blue Gamma dials together.


Use this control to adjust the amount of Red Gamma.


Use this control to adjust the amount of Green Gamma.


Use this control to adjust the amount of Blue Gamma.


Red gamma value


Blue gamma value


Green gamma value


Web site hyperlink


When selected, Glide applications will force 2 Mbytes of texture memory for the texture mapping unit. Some Glide games may not work correctly if this option is not selected.


When selected, Glide will enable triple color buffering if there is enough frame buffer memory to support it. Rendering performance may increase when selected, however not all applications are compatible with triple color buffering, and some may exhibit visual artifacts.


When selected, buffer swaps will not be synchronized with the vertical retrace signal of the monitor. Rendering performance may increase when selected, however visual tearing may occur.


When selected, the Glide splash screen will not be shown.


When selected, texture mipmap dithering will be enabled. Visual quality may improve when selected, however a decrease in rendering performance may occur.


When selected, Direct3D will force on anti-aliasing.  Visual quality may look much smoother when selected, with little or no decrease in performance.


When selected, Direct3D will automatically generate mipmap levels. Visual quality of textures may look much smoother when selected, with little or no decrease in performance.


When selected, overlay mode is enabled.


Click this button to reset all settings to factory default values.


Click this button to reset all settings to factory default values.


When selected, allows Glide/OpenGL advanced properties to be viewed and modified.


When selected, allows Direct3D advanced properties to be viewed and modified.


Displays available resolutions.


Displays available refresh rates for the selected resolution.